% lily-ps-defs.tex
%
\edef\lilypsdefsELC{\the\endlinechar}%
\endlinechar -1\relax

% Header info (macros/defs, etc) should go into a \special{! ... };
% note the ! sign.  See dvips.info for details.
%
% Escape the colon with \string to avoid problems with French while using
% the Babel package.

\gdef\lilypondsetdimen#1{
  \expandafter\special{
    ! /#1 (\csname #1\endcsname) set_tex_dimen
  }
}

\gdef\lilypondspace{ }

\gdef\lilypondpostscript{
  % This sets CTM so that you get to the currentpoint
  % by executing a 0 0 moveto
  \def\embeddedps##1{
    \special{
      ps\string: @beginspecial @setspecial %
                 \lilypondpaperoutputscale\lilypondspace\scaletounit %
                 \lilypondpaperoutputscale\lilypondspace\scaletounit %
                 % FUCKING REDHAT XDVI -- ARG!
                 skeel ##1 @endspecial
    }
  }
  \lilypondsetdimen{lilypondpaperblotdiameter}
}

\gdef\lilypondexperimentalfeatures{}

\endlinechar \lilypsdefsELC
\endinput
